NGC6251 IPOL 1386.723 MHZ NGC6251.ICLN.15

PLot file version 1 created 15-OCT-1999 14:32:04

Peak flux = 4.5131E-01 JY/BEAM Levs = 2.920E-04 * (-1, 1, 2, 4, 6, 8, 10, 12, 16, 32, 64, 128, 256, 512, 1024, 2048)

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

16 32 30 15 00 31 45 30 15 00 30 45 30

82 34 30

00

33 30

00

32 30

00